-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.138823054975
cusum  =  0.163927610432
eta  =  0.569361317382
hl_amp_ratio  =  1.14303549321
kurtosis  =  -1.0256445163
n_points  =  294
period  =  0.749855116787
period_SNR  =  40.9052868549
period_log10FAP  =  -44.5110718819
period_uncertainty  =  0.000126004896313
phase_cusum  =  0.243853998182
phase_eta  =  0.100332753607
phi21  =  -1.52988586675
phi31  =  -2.58807915417
quartile31  =  0.16
r21  =  0.374597593775
r31  =  0.149948337585
shapiro_w  =  0.961327373981
skewness  =  0.203037248697
slope_per10  =  -0.388337857192
slope_per90  =  0.462892963988
stetson_k  =  0.846025075562
weighted_mean  =  14.0218009837
weighted_std  =  0.102008077469
