-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.35594795987
cusum  =  0.129598921165
eta  =  0.492700406909
hl_amp_ratio  =  0.524314342273
kurtosis  =  -1.44283990663
n_points  =  278
period  =  0.61804858345
period_SNR  =  33.870532084
period_log10FAP  =  -37.0662485833
period_uncertainty  =  0.000165088113468
phase_cusum  =  0.268764017516
phase_eta  =  0.0229432190015
phi21  =  4.08991530694
phi31  =  5.27662461832
quartile31  =  0.6775
r21  =  0.515372839766
r31  =  0.344729451486
shapiro_w  =  0.904474258423
skewness  =  -0.245349145424
slope_per10  =  -0.184449496909
slope_per90  =  0.270913337944
stetson_k  =  0.852032690618
weighted_mean  =  14.7767428415
weighted_std  =  0.347853285814
