-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.288620632173
cusum  =  0.112358170007
eta  =  0.612503685345
hl_amp_ratio  =  0.349513383584
kurtosis  =  -0.31374964389
n_points  =  284
period  =  0.687258821966
period_SNR  =  30.2536005069
period_log10FAP  =  -30.7288403108
period_uncertainty  =  0.000126809883466
phase_cusum  =  0.276861276687
phase_eta  =  0.167344597598
phi21  =  -2.20832298517
phi31  =  -4.20997261383
quartile31  =  0.3
r21  =  0.535125773302
r31  =  0.410462332226
shapiro_w  =  0.881799042225
skewness  =  -0.914133913664
slope_per10  =  -0.165627454686
slope_per90  =  0.511065558137
stetson_k  =  0.72302871627
weighted_mean  =  15.0049886681
weighted_std  =  0.259502658676
