-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.231409802094
cusum  =  0.133202910618
eta  =  0.586673139717
hl_amp_ratio  =  0.461961000555
kurtosis  =  -0.466096289925
n_points  =  294
period  =  0.589380857197
period_SNR  =  34.6899298315
period_log10FAP  =  -37.1711515114
period_uncertainty  =  0.00011152659486
phase_cusum  =  0.216328173439
phase_eta  =  0.33842863368
phi21  =  -2.23693612916
phi31  =  -1.00436361869
quartile31  =  0.3
r21  =  0.431940509655
r31  =  0.168234294578
shapiro_w  =  0.93707293272
skewness  =  -0.673064681855
slope_per10  =  -0.158732864363
slope_per90  =  0.311278032871
stetson_k  =  0.775945558747
weighted_mean  =  14.6840498034
weighted_std  =  0.202980934186
