-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.235173025255
cusum  =  0.133631030189
eta  =  0.524719666192
hl_amp_ratio  =  0.476608204591
kurtosis  =  -0.853493429315
n_points  =  360
period  =  0.638231477871
period_SNR  =  43.3408365636
period_log10FAP  =  -47.6446042104
period_uncertainty  =  0.000113523923383
phase_cusum  =  0.263675567609
phase_eta  =  0.240982955511
phi21  =  -2.02176973642
phi31  =  -0.680828261222
quartile31  =  0.3425
r21  =  0.500728537862
r31  =  0.29435610362
shapiro_w  =  0.936262309551
skewness  =  -0.424075014678
slope_per10  =  -0.167680817576
slope_per90  =  0.244193798792
stetson_k  =  0.783069385622
weighted_mean  =  14.882656213
weighted_std  =  0.221214975429
