-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.350479632975
cusum  =  0.140588656563
eta  =  0.581710051013
hl_amp_ratio  =  0.395467214261
kurtosis  =  -0.655170759295
n_points  =  351
period  =  0.503781496547
period_SNR  =  42.4983102004
period_log10FAP  =  -46.7418995695
period_uncertainty  =  0.000108702453024
phase_cusum  =  0.288493644544
phase_eta  =  0.0661599582809
phi21  =  -2.36397056502
phi31  =  -4.54360616374
quartile31  =  0.47
r21  =  0.450953129717
r31  =  0.367048321844
shapiro_w  =  0.886288523674
skewness  =  -0.768461537356
slope_per10  =  -0.123225182736
slope_per90  =  0.17562544896
stetson_k  =  0.760185528874
weighted_mean  =  15.5370770226
weighted_std  =  0.310035507717
