-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.3609637196
cusum  =  0.138445283809
eta  =  0.584263030577
hl_amp_ratio  =  0.297500669882
kurtosis  =  -0.0330471401192
n_points  =  230
period  =  0.818145298382
period_SNR  =  27.9463610349
period_log10FAP  =  -28.1574399252
period_uncertainty  =  0.00025318380309
phase_cusum  =  0.258385373309
phase_eta  =  0.161863450545
phi21  =  3.778066556
phi31  =  4.56188014531
quartile31  =  0.4
r21  =  0.456283799448
r31  =  0.248948371632
shapiro_w  =  0.859413981438
skewness  =  -1.05472256225
slope_per10  =  -0.20164999878
slope_per90  =  0.23453334036
stetson_k  =  0.689727741699
weighted_mean  =  15.7062623962
weighted_std  =  0.319319202924
