<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.78


######### Lightcurve features #########

amplitude  =  0.3751616444
cusum  =  0.208616823218
eta  =  0.624078475244
hl_amp_ratio  =  0.351516262252
kurtosis  =  -0.0262125115575
n_points  =  94
period  =  0.579639349184
period_SNR  =  12.856683431
period_log10FAP  =  -6.8321625093
period_uncertainty  =  0.000109020344732
phase_cusum  =  0.310600399008
phase_eta  =  0.141799102668
phi21  =  -2.3312970711
phi31  =  -4.06591355377
quartile31  =  0.305
r21  =  0.549009449506
r31  =  0.289297377328
shapiro_w  =  0.906775712967
skewness  =  -0.884611873234
slope_per10  =  -0.368846954137
slope_per90  =  0.574707470194
stetson_k  =  0.686778378657
weighted_mean  =  14.7616820276
weighted_std  =  0.252098176769
</pre></body></html>