-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.55


######### Lightcurve features #########

amplitude  =  0.168809665575
cusum  =  0.195194875541
eta  =  1.04372140909
hl_amp_ratio  =  0.649510611212
kurtosis  =  1.46468600158
n_points  =  92
period  =  0.172657700359
period_SNR  =  11.5216776347
period_log10FAP  =  -3.81625472527
period_uncertainty  =  7.73902737362e-06
phase_cusum  =  0.256749559977
phase_eta  =  1.10625057116
phi21  =  1.06282576624
phi31  =  3.30664901081
quartile31  =  0.2625
r21  =  0.131916096041
r31  =  0.147108849387
shapiro_w  =  0.932073235512
skewness  =  -1.03722961486
slope_per10  =  -0.0547381978506
slope_per90  =  0.150824778167
stetson_k  =  0.756661911543
weighted_mean  =  14.9860964368
weighted_std  =  0.178203847201
