-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.29


######### Lightcurve features #########

amplitude  =  0.109442637337
cusum  =  0.174460009783
eta  =  0.703130049703
hl_amp_ratio  =  0.756435638922
kurtosis  =  2.22186676757
n_points  =  331
period  =  1.00082918383
period_SNR  =  11.2308768892
period_log10FAP  =  -8.46436326399
period_uncertainty  =  0.000275558716045
phase_cusum  =  0.174158543856
phase_eta  =  1.11814182903
phi21  =  -0.674080525305
phi31  =  -4.05625287788
quartile31  =  0.18
r21  =  0.336920575368
r31  =  0.10481397263
shapiro_w  =  0.939187586308
skewness  =  -1.01483530672
slope_per10  =  -0.142176390804
slope_per90  =  0.0987217343801
stetson_k  =  0.720746666725
weighted_mean  =  11.0649546828
weighted_std  =  0.168640147821
