<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_c
class_probability =  0.55


######### Lightcurve features #########

amplitude  =  0.270647710829
cusum  =  0.1609889212
eta  =  0.386616315316
hl_amp_ratio  =  1.43192600752
kurtosis  =  -0.982979915831
n_points  =  172
period  =  0.378269087353
period_SNR  =  26.9270550804
period_log10FAP  =  -26.2943277321
period_uncertainty  =  4.72265712159e-05
phase_cusum  =  0.288950535093
phase_eta  =  0.158435121064
phi21  =  -1.14485032609
phi31  =  -2.18958332431
quartile31  =  0.33
r21  =  0.218076460294
r31  =  0.0790765981178
shapiro_w  =  0.961853086948
skewness  =  0.245252830589
slope_per10  =  -0.137990006246
slope_per90  =  0.193314786263
stetson_k  =  0.838029140225
weighted_mean  =  12.7025
weighted_std  =  0.189237346595
</pre></body></html>