-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.86


######### Lightcurve features #########

amplitude  =  0.243912789034
cusum  =  0.219125130864
eta  =  0.942765474757
hl_amp_ratio  =  0.469307588352
kurtosis  =  0.246028716355
n_points  =  93
period  =  0.569274114387
period_SNR  =  11.3404740035
period_log10FAP  =  -4.4598630535
period_uncertainty  =  0.000105156297664
phase_cusum  =  0.43503021459
phase_eta  =  0.569633093999
phi21  =  3.88138200087
phi31  =  4.75749948065
quartile31  =  0.28
r21  =  0.601922477612
r31  =  0.408530028057
shapiro_w  =  0.950619339943
skewness  =  -0.773092247168
slope_per10  =  -0.155749998055
slope_per90  =  0.163093918731
stetson_k  =  0.684746956943
weighted_mean  =  16.5342638119
weighted_std  =  0.217155690608
