-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.207269912495
cusum  =  0.211455570394
eta  =  0.632379235156
hl_amp_ratio  =  0.667311921793
kurtosis  =  -0.840394705133
n_points  =  122
period  =  0.584090848574
period_SNR  =  20.5535471955
period_log10FAP  =  -13.5729202214
period_uncertainty  =  0.000133537009117
phase_cusum  =  0.262732724236
phase_eta  =  0.461918114636
phi21  =  0.810148897472
phi31  =  1.96172159967
quartile31  =  0.2575
r21  =  0.340576467936
r31  =  0.178419503811
shapiro_w  =  0.942734956741
skewness  =  -0.373811842606
slope_per10  =  -0.423353829179
slope_per90  =  0.312333336721
stetson_k  =  0.786123020097
weighted_mean  =  14.1612553531
weighted_std  =  0.175143313834
