-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.18937134696
cusum  =  0.123371948846
eta  =  0.546313475049
hl_amp_ratio  =  0.376620431373
kurtosis  =  -0.748127700262
n_points  =  286
period  =  0.609001985279
period_SNR  =  33.3923286468
period_log10FAP  =  -33.7009278702
period_uncertainty  =  0.000101867055004
phase_cusum  =  0.264976479021
phase_eta  =  0.318594263598
phi21  =  -2.35583630496
phi31  =  -1.45014934009
quartile31  =  0.24
r21  =  0.449437851362
r31  =  0.272724716295
shapiro_w  =  0.911346971989
skewness  =  -0.664644517379
slope_per10  =  -0.23515689432
slope_per90  =  0.360499997623
stetson_k  =  0.761472147673
weighted_mean  =  13.7970257493
weighted_std  =  0.166501233622
