-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.6


######### Lightcurve features #########

amplitude  =  0.274991560459
cusum  =  0.099123050297
eta  =  0.613391101405
hl_amp_ratio  =  0.980262070445
kurtosis  =  -1.21727660097
n_points  =  300
period  =  0.709441315154
period_SNR  =  34.6320230879
period_log10FAP  =  -29.71008818
period_uncertainty  =  0.000228336456471
phase_cusum  =  0.207486471334
phase_eta  =  0.785077593237
phi21  =  -2.183239233
phi31  =  -2.69161144946
quartile31  =  0.45
r21  =  0.288312771622
r31  =  0.0496411287089
shapiro_w  =  0.951506733894
skewness  =  -0.0913567246219
slope_per10  =  -0.139889764687
slope_per90  =  0.147353663295
stetson_k  =  0.867037534834
weighted_mean  =  14.1745515531
weighted_std  =  0.244241922493
