-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.267804401018
cusum  =  0.129969816868
eta  =  0.498919290863
hl_amp_ratio  =  0.699415430786
kurtosis  =  -1.12324197997
n_points  =  346
period  =  0.639346579437
period_SNR  =  44.2390270042
period_log10FAP  =  -47.6463438711
period_uncertainty  =  0.000132087309426
phase_cusum  =  0.31012672754
phase_eta  =  0.0527544762872
phi21  =  -2.22923528613
phi31  =  -1.34617910582
quartile31  =  0.44
r21  =  0.39458833986
r31  =  0.369514151598
shapiro_w  =  0.914392352104
skewness  =  -0.435582547863
slope_per10  =  -0.203509071424
slope_per90  =  0.376398185243
stetson_k  =  0.862710325815
weighted_mean  =  13.3816054159
weighted_std  =  0.238445430683
