-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.193149914344
cusum  =  0.128478988959
eta  =  0.639406855625
hl_amp_ratio  =  0.838366268906
kurtosis  =  -0.818207009911
n_points  =  219
period  =  0.609719839847
period_SNR  =  20.4128884651
period_log10FAP  =  -18.9360616396
period_uncertainty  =  0.00010045470142
phase_cusum  =  0.212495847843
phase_eta  =  0.37303250604
phi21  =  -2.23599489261
phi31  =  -3.98633723836
quartile31  =  0.315
r21  =  0.467843326021
r31  =  0.265648915129
shapiro_w  =  0.963546454906
skewness  =  -0.0734379178692
slope_per10  =  -0.332499989308
slope_per90  =  0.222533339014
stetson_k  =  0.863654886585
weighted_mean  =  12.0406392694
weighted_std  =  0.186264780631
