-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.260524782896
cusum  =  0.102977690342
eta  =  0.493634052222
hl_amp_ratio  =  0.656645294607
kurtosis  =  -0.718942290993
n_points  =  386
period  =  0.570026525026
period_SNR  =  47.2156482925
period_log10FAP  =  -52.5256076912
period_uncertainty  =  0.000104254077442
phase_cusum  =  0.216019524711
phase_eta  =  0.216175441411
phi21  =  0.967838743876
phi31  =  -0.838498038893
quartile31  =  0.3375
r21  =  0.463526130803
r31  =  0.249796834221
shapiro_w  =  0.961393296719
skewness  =  -0.4537032152
slope_per10  =  -0.115589495588
slope_per90  =  0.172346940231
stetson_k  =  0.816963572417
weighted_mean  =  15.2323679777
weighted_std  =  0.223179817322
