-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.278481197036
cusum  =  0.0851605527668
eta  =  0.522369491418
hl_amp_ratio  =  0.575586978689
kurtosis  =  -0.632115123721
n_points  =  301
period  =  0.637829740812
period_SNR  =  36.2731558237
period_log10FAP  =  -35.6562634927
period_uncertainty  =  0.000109329749538
phase_cusum  =  0.224571601609
phase_eta  =  0.162356665245
phi21  =  -2.16933662409
phi31  =  -0.965747530454
quartile31  =  0.28
r21  =  0.561098970277
r31  =  0.344906020047
shapiro_w  =  0.91946709156
skewness  =  -0.665594665367
slope_per10  =  -0.192782536212
slope_per90  =  0.405399999581
stetson_k  =  0.776370960868
weighted_mean  =  13.9516242246
weighted_std  =  0.245509071867
