<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.303712982145
cusum  =  0.299594992254
eta  =  1.12113491802
hl_amp_ratio  =  0.560571822376
kurtosis  =  0.539064700182
n_points  =  87
period  =  0.482581138812
period_SNR  =  12.2030384492
period_log10FAP  =  -3.87167244105
period_uncertainty  =  6.04586753178e-05
phase_cusum  =  0.381471337137
phase_eta  =  0.775967451329
phi21  =  -2.22061540089
phi31  =  -5.04048756043
quartile31  =  0.3
r21  =  0.472223353252
r31  =  0.138229054796
shapiro_w  =  0.974400579929
skewness  =  -0.505327937133
slope_per10  =  -0.0915134120653
slope_per90  =  0.156833036398
stetson_k  =  0.622297840334
weighted_mean  =  17.635342254
weighted_std  =  0.302098358145
</pre></body></html>