-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.337420875045
cusum  =  0.164466547689
eta  =  0.617856702033
hl_amp_ratio  =  0.314833618054
kurtosis  =  -0.247217891451
n_points  =  260
period  =  0.621154724536
period_SNR  =  31.3660816166
period_log10FAP  =  -30.8915290808
period_uncertainty  =  0.000104339639414
phase_cusum  =  0.248311713787
phase_eta  =  0.265795366054
phi21  =  0.7020998186
phi31  =  -1.07861323067
quartile31  =  0.485
r21  =  0.449009642459
r31  =  0.319280672375
shapiro_w  =  0.896927595139
skewness  =  -0.671228435303
slope_per10  =  -0.214519022889
slope_per90  =  0.449470144854
stetson_k  =  0.696234220412
weighted_mean  =  13.4295241158
weighted_std  =  0.304915831353
