-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.49


######### Lightcurve features #########

amplitude  =  0.243652905412
cusum  =  0.123036080437
eta  =  0.439379417053
hl_amp_ratio  =  0.801821087315
kurtosis  =  -0.27647993155
n_points  =  356
period  =  0.787625514911
period_SNR  =  37.8409167726
period_log10FAP  =  -42.8438110532
period_uncertainty  =  0.000199617867408
phase_cusum  =  0.237869601804
phase_eta  =  0.388952584042
phi21  =  1.58242070758
phi31  =  1.78765802901
quartile31  =  0.34
r21  =  0.274712314255
r31  =  0.228566160114
shapiro_w  =  0.972552001476
skewness  =  -0.299654401619
slope_per10  =  -0.197103185425
slope_per90  =  0.162098336289
stetson_k  =  0.840388192665
weighted_mean  =  12.4095206767
weighted_std  =  0.21755725965
