-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.215747708315
cusum  =  0.110123378305
eta  =  0.458366820851
hl_amp_ratio  =  0.551210076668
kurtosis  =  -0.837108015243
n_points  =  355
period  =  0.726407802121
period_SNR  =  41.3738320999
period_log10FAP  =  -46.7938358693
period_uncertainty  =  0.000141599966592
phase_cusum  =  0.270197257395
phase_eta  =  0.269403999976
phi21  =  1.24552875798
phi31  =  -0.545392615116
quartile31  =  0.305
r21  =  0.459205304815
r31  =  0.275507043443
shapiro_w  =  0.949081420898
skewness  =  -0.463752792562
slope_per10  =  -0.150806909204
slope_per90  =  0.368281892606
stetson_k  =  0.811496463989
weighted_mean  =  13.2488157271
weighted_std  =  0.203114591639
