-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.39


######### Lightcurve features #########

amplitude  =  0.330025888727
cusum  =  0.341431746393
eta  =  0.817711541436
hl_amp_ratio  =  1.23794539388
kurtosis  =  -0.16725343669
n_points  =  38
period  =  0.838878724699
period_SNR  =  7.55525733913
period_log10FAP  =  -1.4095703743
period_uncertainty  =  0.0001855721194
phase_cusum  =  0.323506774544
phase_eta  =  0.391568150693
phi21  =  0.323215102065
phi31  =  0.371713388552
quartile31  =  0.1175
r21  =  0.408045857494
r31  =  0.315243115903
shapiro_w  =  0.946223080158
skewness  =  0.396125910943
slope_per10  =  -1.21441184413
slope_per90  =  0.67604035702
stetson_k  =  0.731538402053
weighted_mean  =  12.0426530612
weighted_std  =  0.137822356976
