-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.177771886383
cusum  =  0.150492810104
eta  =  0.655019697851
hl_amp_ratio  =  0.724400932886
kurtosis  =  -1.1366394862
n_points  =  279
period  =  0.640539667672
period_SNR  =  44.8275888248
period_log10FAP  =  -37.3332799753
period_uncertainty  =  0.000117728953177
phase_cusum  =  0.250969967098
phase_eta  =  0.302690252707
phi21  =  -2.10755330515
phi31  =  -3.59907231825
quartile31  =  0.255
r21  =  0.370903564205
r31  =  0.157782799835
shapiro_w  =  0.959595739841
skewness  =  -0.144491978519
slope_per10  =  -0.155737168226
slope_per90  =  0.206162391874
stetson_k  =  0.844566435774
weighted_mean  =  16.2700414681
weighted_std  =  0.146580971967
