-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.362691813866
cusum  =  0.297146198918
eta  =  0.538341462646
hl_amp_ratio  =  0.641277885997
kurtosis  =  -0.378242963519
n_points  =  60
period  =  0.734699462366
period_SNR  =  9.96304795335
period_log10FAP  =  -4.45599068777
period_uncertainty  =  0.000142342243523
phase_cusum  =  0.278599246945
phase_eta  =  0.470015134977
phi21  =  2.3676029261
phi31  =  3.80326317154
quartile31  =  0.3575
r21  =  0.321753607338
r31  =  0.13236750638
shapiro_w  =  0.942022025585
skewness  =  -0.60151830837
slope_per10  =  -0.58527498506
slope_per90  =  0.127238091636
stetson_k  =  0.727651111125
weighted_mean  =  15.2332715712
weighted_std  =  0.296877687355
