-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.235774356134
cusum  =  0.156482238827
eta  =  0.568222363806
hl_amp_ratio  =  0.64790616383
kurtosis  =  -0.986594540613
n_points  =  216
period  =  0.590303405816
period_SNR  =  23.216810688
period_log10FAP  =  -23.7859147275
period_uncertainty  =  0.000112926302911
phase_cusum  =  0.323133099909
phase_eta  =  0.165392164205
phi21  =  -1.95448206256
phi31  =  -0.400226138956
quartile31  =  0.3425
r21  =  0.479124961129
r31  =  0.271676070527
shapiro_w  =  0.963824748993
skewness  =  -0.248385154847
slope_per10  =  -0.149710032981
slope_per90  =  0.499999988824
stetson_k  =  0.831052764652
weighted_mean  =  13.397248062
weighted_std  =  0.204596275967
