-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.485560634302
cusum  =  0.108571960657
eta  =  0.653352805105
hl_amp_ratio  =  0.514676334413
kurtosis  =  -0.677494966573
n_points  =  243
period  =  0.61588679566
period_SNR  =  37.4463638301
period_log10FAP  =  -30.9967797353
period_uncertainty  =  0.000133665663338
phase_cusum  =  0.232626865093
phase_eta  =  0.16709782147
phi21  =  0.691153019214
phi31  =  1.90648991864
quartile31  =  0.635
r21  =  0.462815601899
r31  =  0.243025128061
shapiro_w  =  0.928192675114
skewness  =  -0.623482158063
slope_per10  =  -0.127924353526
slope_per90  =  0.264238948727
stetson_k  =  0.776550623299
weighted_mean  =  12.6920800585
weighted_std  =  0.375044584917
