-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.56


######### Lightcurve features #########

amplitude  =  0.206103596119
cusum  =  0.21746111746
eta  =  0.373403108521
hl_amp_ratio  =  0.893192930454
kurtosis  =  0.323024668408
n_points  =  283
period  =  0.202519147075
period_SNR  =  19.5560228527
period_log10FAP  =  -14.8642351115
period_uncertainty  =  1.15342947776e-05
phase_cusum  =  0.209755640846
phase_eta  =  0.977559335758
phi21  =  2.52743211329
phi31  =  2.84745892215
quartile31  =  0.345
r21  =  0.397229494178
r31  =  0.341157439003
shapiro_w  =  0.942609548569
skewness  =  0.497748735316
slope_per10  =  -0.036441792904
slope_per90  =  0.0363681986747
stetson_k  =  0.776869668753
weighted_mean  =  10.4986925795
weighted_std  =  0.243613958172
