-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.52


######### Lightcurve features #########

amplitude  =  0.0710575485493
cusum  =  0.201899960169
eta  =  1.06610387948
hl_amp_ratio  =  0.897052893417
kurtosis  =  -0.976847935548
n_points  =  60
period  =  0.148296004341
period_SNR  =  10.0880282523
period_log10FAP  =  -2.53810224378
period_uncertainty  =  5.79926889575e-06
phase_cusum  =  0.289389588148
phase_eta  =  0.963256211104
phi21  =  -1.82308746525
phi31  =  -2.7269842457
quartile31  =  0.1125
r21  =  0.0235863524532
r31  =  0.18713000908
shapiro_w  =  0.96797478199
skewness  =  -0.0723701722355
slope_per10  =  -0.175386051873
slope_per90  =  0.319046744042
stetson_k  =  0.847360722429
weighted_mean  =  14.8364221131
weighted_std  =  0.0687729600788
