-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.304380783297
cusum  =  0.166129932179
eta  =  0.733022457506
hl_amp_ratio  =  0.333625712339
kurtosis  =  -0.0890081145085
n_points  =  310
period  =  0.540471768986
period_SNR  =  42.464472347
period_log10FAP  =  -36.5042196977
period_uncertainty  =  0.000115690249049
phase_cusum  =  0.268731830653
phase_eta  =  0.207857031935
phi21  =  0.739916539694
phi31  =  -1.23024973766
quartile31  =  0.35
r21  =  0.499429715418
r31  =  0.261485779847
shapiro_w  =  0.915533959866
skewness  =  -0.672997853536
slope_per10  =  -0.13373514309
slope_per90  =  0.180666670203
stetson_k  =  0.700756323541
weighted_mean  =  14.4285689856
weighted_std  =  0.251157598115
