-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.53


######### Lightcurve features #########

amplitude  =  0.451724771073
cusum  =  0.241100707312
eta  =  0.534934090517
hl_amp_ratio  =  0.43151761275
kurtosis  =  -1.24919740555
n_points  =  60
period  =  0.776920974186
period_SNR  =  10.7878601344
period_log10FAP  =  -4.60853884952
period_uncertainty  =  0.000198945258398
phase_cusum  =  0.340394305756
phase_eta  =  0.42664737492
phi21  =  -1.58730376096
phi31  =  -3.31247777806
quartile31  =  0.6825
r21  =  0.501096179194
r31  =  0.0931078667531
shapiro_w  =  0.86194986105
skewness  =  -0.523257743828
slope_per10  =  -0.252437137496
slope_per90  =  0.451672734185
stetson_k  =  0.80205566977
weighted_mean  =  14.392789296
weighted_std  =  0.385203808296
