-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.49


######### Lightcurve features #########

amplitude  =  0.455496688179
cusum  =  0.195732354183
eta  =  0.760309656276
hl_amp_ratio  =  0.580849722937
kurtosis  =  -1.2351119629
n_points  =  60
period  =  0.178542398597
period_SNR  =  10.9234340763
period_log10FAP  =  -4.50741683938
period_uncertainty  =  8.40614887322e-06
phase_cusum  =  0.377504314748
phase_eta  =  0.526027829212
phi21  =  1.19944143595
phi31  =  2.16017763418
quartile31  =  0.6575
r21  =  0.18066895069
r31  =  0.078048745735
shapiro_w  =  0.912097334862
skewness  =  -0.384647592913
slope_per10  =  -0.0450403827454
slope_per90  =  0.108191671429
stetson_k  =  0.8089527026
weighted_mean  =  16.0839370449
weighted_std  =  0.403464755304
