<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.207344672231
cusum  =  0.136099782983
eta  =  0.602612413541
hl_amp_ratio  =  1.00390620503
kurtosis  =  -0.987413068444
n_points  =  350
period  =  0.777365465362
period_SNR  =  54.7530693508
period_log10FAP  =  -49.8092787247
period_uncertainty  =  0.000137028995155
phase_cusum  =  0.232526619597
phase_eta  =  0.139300739415
phi21  =  1.24766834863
phi31  =  2.81721289768
quartile31  =  0.28
r21  =  0.462674370221
r31  =  0.201922820601
shapiro_w  =  0.966425895691
skewness  =  -0.156239078739
slope_per10  =  -0.232986741713
slope_per90  =  0.379187730809
stetson_k  =  0.861244128125
weighted_mean  =  13.8985257276
weighted_std  =  0.169757762877
</pre></body></html>