-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.61


######### Lightcurve features #########

amplitude  =  0.207028711239
cusum  =  0.412840958805
eta  =  0.391596323483
hl_amp_ratio  =  0.341379763831
kurtosis  =  -0.872950148141
n_points  =  60
period  =  0.160902549007
period_SNR  =  10.3820290281
period_log10FAP  =  -5.13982166203
period_uncertainty  =  8.5341333108e-06
phase_cusum  =  0.294756172822
phase_eta  =  0.384903915183
phi21  =  -2.87348229222
phi31  =  -2.58666478426
quartile31  =  0.26
r21  =  0.230526976754
r31  =  0.103170044349
shapiro_w  =  0.898170471191
skewness  =  -0.659645758215
slope_per10  =  -0.103492259631
slope_per90  =  0.224152762226
stetson_k  =  0.764335215773
weighted_mean  =  15.1702073786
weighted_std  =  0.167665716431
