<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.349886119473
cusum  =  0.0989654450276
eta  =  0.685821334517
hl_amp_ratio  =  0.591790787696
kurtosis  =  -0.693696548716
n_points  =  332
period  =  0.489951067659
period_SNR  =  46.0496303354
period_log10FAP  =  -39.5163622627
period_uncertainty  =  9.52523912849e-05
phase_cusum  =  0.250662192161
phase_eta  =  0.457183877397
phi21  =  1.07992993676
phi31  =  2.26885706834
quartile31  =  0.4625
r21  =  0.420944592981
r31  =  0.251022852665
shapiro_w  =  0.934341073036
skewness  =  -0.583624513689
slope_per10  =  -0.0860865626424
slope_per90  =  0.126620827555
stetson_k  =  0.822770580583
weighted_mean  =  13.3936006206
weighted_std  =  0.310224727638
</pre></body></html>