-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.64


######### Lightcurve features #########

amplitude  =  0.177879760257
cusum  =  0.156466604247
eta  =  0.630117661479
hl_amp_ratio  =  0.666368619813
kurtosis  =  -0.709615249488
n_points  =  321
period  =  0.344262871032
period_SNR  =  44.0184215318
period_log10FAP  =  -36.1234688377
period_uncertainty  =  5.37595748318e-05
phase_cusum  =  0.206150465873
phase_eta  =  0.728881320301
phi21  =  -0.807655448181
phi31  =  -2.28509028528
quartile31  =  0.25
r21  =  0.0582229853421
r31  =  0.0308044846485
shapiro_w  =  0.962834477425
skewness  =  -0.442569386074
slope_per10  =  -0.0581853454381
slope_per90  =  0.0663575416684
stetson_k  =  0.803996691794
weighted_mean  =  13.3535295125
weighted_std  =  0.161400725769
