-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.249516554228
cusum  =  0.211213910037
eta  =  0.487399801401
hl_amp_ratio  =  0.816490331988
kurtosis  =  -1.29008657647
n_points  =  319
period  =  0.723470699926
period_SNR  =  49.6141608263
period_log10FAP  =  -45.1057327031
period_uncertainty  =  0.000237417597171
phase_cusum  =  0.254390262316
phase_eta  =  0.290522980183
phi21  =  1.33606491257
phi31  =  2.72603993703
quartile31  =  0.39
r21  =  0.351098512119
r31  =  0.12532005806
shapiro_w  =  0.932261943817
skewness  =  -0.201742100886
slope_per10  =  -0.178359638027
slope_per90  =  0.271594342512
stetson_k  =  0.869877924732
weighted_mean  =  12.559936252
weighted_std  =  0.220508703868
