-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.79


######### Lightcurve features #########

amplitude  =  0.411923919454
cusum  =  0.0953949798336
eta  =  0.557740803184
hl_amp_ratio  =  0.499047861724
kurtosis  =  -1.22653358835
n_points  =  300
period  =  0.621706370285
period_SNR  =  44.6588094922
period_log10FAP  =  -39.38087827
period_uncertainty  =  0.000111440881455
phase_cusum  =  0.262982341484
phase_eta  =  0.317335133452
phi21  =  0.781596505337
phi31  =  1.89635821389
quartile31  =  0.7
r21  =  0.431970561893
r31  =  0.267672524861
shapiro_w  =  0.908794224262
skewness  =  -0.423566508332
slope_per10  =  -0.0889706985805
slope_per90  =  0.191127105528
stetson_k  =  0.823835540515
weighted_mean  =  12.5646806214
weighted_std  =  0.390679927278
