-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.353689585137
cusum  =  0.0912385641608
eta  =  0.585481990013
hl_amp_ratio  =  0.21251575029
kurtosis  =  -0.337581828353
n_points  =  251
period  =  0.479101971045
period_SNR  =  35.0709222484
period_log10FAP  =  -29.0566297881
period_uncertainty  =  0.000105873043168
phase_cusum  =  0.250806502235
phase_eta  =  0.421650390587
phi21  =  -2.47706971355
phi31  =  -4.43696700296
quartile31  =  0.445
r21  =  0.457793467766
r31  =  0.251260467053
shapiro_w  =  0.850407779217
skewness  =  -0.968174925773
slope_per10  =  -0.165505120533
slope_per90  =  0.211864344704
stetson_k  =  0.66807452156
weighted_mean  =  15.0507656928
weighted_std  =  0.304001394515
