-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.59


######### Lightcurve features #########

amplitude  =  0.240737699554
cusum  =  0.190952248466
eta  =  0.60094169511
hl_amp_ratio  =  0.384762249696
kurtosis  =  0.301458137258
n_points  =  60
period  =  0.124895883903
period_SNR  =  8.20472877774
period_log10FAP  =  -2.23691477361
period_uncertainty  =  4.1134914463e-06
phase_cusum  =  0.238651625526
phase_eta  =  0.601361437321
phi21  =  -0.1911965695
phi31  =  1.91586438486
quartile31  =  0.2225
r21  =  0.184781791259
r31  =  0.00869021605844
shapiro_w  =  0.91114294529
skewness  =  -0.981062816798
slope_per10  =  -0.0868017990556
slope_per90  =  0.0627039881669
stetson_k  =  0.694966176882
weighted_mean  =  16.1392866352
weighted_std  =  0.229115434805
