-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.43


######### Lightcurve features #########

amplitude  =  0.454294435342
cusum  =  0.188350488918
eta  =  0.816533056678
hl_amp_ratio  =  0.305984747674
kurtosis  =  -0.810311841267
n_points  =  60
period  =  1.4839175406
period_SNR  =  10.7458529162
period_log10FAP  =  -3.97245039155
period_uncertainty  =  0.000725703189246
phase_cusum  =  0.372507227737
phase_eta  =  0.478213225301
phi21  =  -1.67477094878
phi31  =  0.566895003676
quartile31  =  0.4925
r21  =  0.199856072578
r31  =  0.261799982696
shapiro_w  =  0.888874650002
skewness  =  -0.706606983072
slope_per10  =  -0.0931552436099
slope_per90  =  0.534588586612
stetson_k  =  0.691306579982
weighted_mean  =  15.9486649442
weighted_std  =  0.341860575704
