-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  LPV_SRV_AGB_C
class_probability =  0.32


######### Lightcurve features #########

amplitude  =  0.356915039917
cusum  =  0.457551082722
eta  =  0.394914933691
hl_amp_ratio  =  0.639466336877
kurtosis  =  -0.995786183178
n_points  =  43
period  =  2528.07751
period_SNR  =  8.17439440311
period_log10FAP  =  -2.0621481989
period_uncertainty  =  3033.693012
phase_cusum  =  0.451599507907
phase_eta  =  0.428466418436
phi21  =  -1.92465970437
phi31  =  -3.83398185905
quartile31  =  0.52
r21  =  0.0473262410846
r31  =  0.209586505724
shapiro_w  =  0.957009315491
skewness  =  -0.323652708023
slope_per10  =  -739.5290625
slope_per90  =  0.653999997303
stetson_k  =  0.815230767226
weighted_mean  =  15.3876706934
weighted_std  =  0.303498695837
