-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.41


######### Lightcurve features #########

amplitude  =  0.20369145765
cusum  =  0.290134759213
eta  =  0.846860814607
hl_amp_ratio  =  1.20940262832
kurtosis  =  -0.961448248133
n_points  =  60
period  =  0.127987825273
period_SNR  =  9.49469143364
period_log10FAP  =  -3.19703280486
period_uncertainty  =  5.39969225118e-06
phase_cusum  =  0.288838643258
phase_eta  =  0.780307698291
phi21  =  2.42087377432
phi31  =  4.45982173181
quartile31  =  0.32
r21  =  0.26021236231
r31  =  0.204461107966
shapiro_w  =  0.969120204449
skewness  =  0.106273618942
slope_per10  =  -0.0856567210242
slope_per90  =  0.0661926369301
stetson_k  =  0.846205982448
weighted_mean  =  15.0808563053
weighted_std  =  0.187943810056
