-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.334480375529
cusum  =  0.301656637397
eta  =  0.367356121855
hl_amp_ratio  =  0.395577578264
kurtosis  =  -0.187096803786
n_points  =  60
period  =  0.568922252644
period_SNR  =  10.410694692
period_log10FAP  =  -4.42189920203
period_uncertainty  =  0.000106683594331
phase_cusum  =  0.322586319046
phase_eta  =  0.607933109665
phi21  =  2.86133658655
phi31  =  1.76163505197
quartile31  =  0.395
r21  =  0.303189061507
r31  =  0.264919251647
shapiro_w  =  0.901529729366
skewness  =  -0.899477489272
slope_per10  =  -0.107026667024
slope_per90  =  0.117531957037
stetson_k  =  0.693026897318
weighted_mean  =  15.8121429389
weighted_std  =  0.309994606597
