-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.435620396019
cusum  =  0.157607107907
eta  =  0.631708579694
hl_amp_ratio  =  0.767516445633
kurtosis  =  -0.280989951267
n_points  =  222
period  =  0.639348797398
period_SNR  =  33.1282530118
period_log10FAP  =  -25.3316979713
period_uncertainty  =  0.000118152871518
phase_cusum  =  0.280396643116
phase_eta  =  0.427855681494
phi21  =  0.712516382265
phi31  =  -1.51365230798
quartile31  =  0.46
r21  =  0.381789947314
r31  =  0.225760328996
shapiro_w  =  0.918083667755
skewness  =  -0.538845638112
slope_per10  =  -0.156104955161
slope_per90  =  0.177411670197
stetson_k  =  0.810634169312
weighted_mean  =  12.0136238327
weighted_std  =  0.345216956981
