-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.335636870256
cusum  =  0.112257583121
eta  =  0.655877929647
hl_amp_ratio  =  0.776204695085
kurtosis  =  -0.652939522523
n_points  =  276
period  =  0.552930980517
period_SNR  =  37.7434680378
period_log10FAP  =  -30.7142821831
period_uncertainty  =  0.000140400179584
phase_cusum  =  0.224403047988
phase_eta  =  0.56957560405
phi21  =  -2.51174225201
phi31  =  -4.06785712724
quartile31  =  0.47
r21  =  0.348818094993
r31  =  0.114069894733
shapiro_w  =  0.949492394924
skewness  =  -0.493410076911
slope_per10  =  -0.0843062107063
slope_per90  =  0.183545258524
stetson_k  =  0.844519350827
weighted_mean  =  10.5915283447
weighted_std  =  0.291061821424
