-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.24010625013
cusum  =  0.116486718913
eta  =  0.565500759986
hl_amp_ratio  =  0.482592081589
kurtosis  =  -0.549874761062
n_points  =  326
period  =  0.556817490107
period_SNR  =  42.2831786555
period_log10FAP  =  -40.4901706222
period_uncertainty  =  0.00010492133218
phase_cusum  =  0.298078901156
phase_eta  =  0.429166294239
phi21  =  -1.97194952317
phi31  =  -1.06112529122
quartile31  =  0.3075
r21  =  0.359121587437
r31  =  0.152934639483
shapiro_w  =  0.922985970974
skewness  =  -0.697409727414
slope_per10  =  -0.095215452646
slope_per90  =  0.136685359943
stetson_k  =  0.773209041356
weighted_mean  =  15.9362506007
weighted_std  =  0.207115344984
