-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.76


######### Lightcurve features #########

amplitude  =  0.109219002422
cusum  =  0.170627440612
eta  =  1.77965299646
hl_amp_ratio  =  0.813538863997
kurtosis  =  0.373273001659
n_points  =  310
period  =  0.104777166259
period_SNR  =  12.5867338155
period_log10FAP  =  -1.1522959765
period_uncertainty  =  2.47673808501e-06
phase_cusum  =  0.176349562273
phase_eta  =  1.94495779539
phi21  =  2.08035992343
phi31  =  3.81199624591
quartile31  =  0.32
r21  =  0.248584697121
r31  =  0.197869926261
shapiro_w  =  0.992258250713
skewness  =  -0.138699034314
slope_per10  =  -0.00709606895807
slope_per90  =  0.00829110860585
stetson_k  =  0.750829770015
weighted_mean  =  19.173822205
weighted_std  =  0.250252463513
