-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.131377680229
cusum  =  0.153922030403
eta  =  0.615476404584
hl_amp_ratio  =  0.784479468986
kurtosis  =  -1.09483492183
n_points  =  327
period  =  0.618241714166
period_SNR  =  42.499714157
period_log10FAP  =  -41.958490642
period_uncertainty  =  0.000108220440476
phase_cusum  =  0.213567970267
phase_eta  =  0.491376569567
phi21  =  -1.92088365964
phi31  =  -2.32602637818
quartile31  =  0.18
r21  =  0.341141692942
r31  =  0.0402387458086
shapiro_w  =  0.954466223717
skewness  =  -0.24877859084
slope_per10  =  -0.21145631526
slope_per90  =  0.230174321202
stetson_k  =  0.853458371548
weighted_mean  =  15.5991424802
weighted_std  =  0.107151549841
